Red Hat Enterprise Linux 7

DM Multipath

DM Multipath Configuration and Administration

Legal Notice

Copyright © 2015 Red Hat, Inc. and others.

This document is licensed by Red Hat under the Creative Commons Attribution-ShareAlike 3.0 Unported License. If you distribute this document, or a modified version of it, you must provide attribution to Red Hat, Inc. and provide a link to the original. If the document is modified, all Red Hat trademarks must be removed.

Red Hat, as the licensor of this document, waives the right to enforce, and agrees not to assert, Section 4d of CC-BY-SA to the fullest extent permitted by applicable law.

Red Hat, Red Hat Enterprise Linux, the Shadowman logo, JBoss, MetaMatrix, Fedora, the Infinity Logo, and RHCE are trademarks of Red Hat, Inc., registered in the United States and other countries.

Linux® is the registered trademark of Linus Torvalds in the United States and other countries.

Java® is a registered trademark of Oracle and/or its affiliates.

XFS® is a trademark of Silicon Graphics International Corp. or its subsidiaries in the United States and/or other countries.

MySQL® is a registered trademark of MySQL AB in the United States, the European Union and other countries.

Node.js® is an official trademark of Joyent. Red Hat Software Collections is not formally related to or endorsed by the official Joyent Node.js open source or commercial project.

The OpenStack® Word Mark and OpenStack Logo are either registered trademarks/service marks or trademarks/service marks of the OpenStack Foundation, in the United States and other countries and are used with the OpenStack Foundation's permission. We are not affiliated with, endorsed or sponsored by the OpenStack Foundation, or the OpenStack community.

All other trademarks are the property of their respective owners.

Abstract

This book provides information on using the Device-Mapper Multipath feature of Red Hat Enterprise Linux 7.

⁠Chapter 1. Device Mapper Multipathing

Device mapper multipathing (DM Multipath) allows you to configure multiple I/O paths between server nodes and storage arrays into a single device. These I/O paths are physical SAN connections that can include separate cables, switches, and controllers. Multipathing aggregates the I/O paths, creating a new device that consists of the aggregated paths.

This chapter provides a summary of the features of DM-Multipath that were added subsequent to the initial release of Red Hat Enterprise Linux 7. Following that, this chapter provides a high-level overview of DM Multipath and its components, as well as an overview of DM-Multipath setup.

⁠1.1. New and Changed Features

This section lists features of the DM Multipath that are new since the initial release of Red Hat Enterprise Linux 7.

⁠1.1.1. New and Changed Features for Red Hat Enterprise Linux 7.1

Red Hat Enterprise Linux 7.1 includes the following documentation and feature updates and changes.

Table 5.1, “Useful multipath Command Options”. now includes entries for the -w and -W options of the multipath command, which allow you to better manage the wwids file.

Additional options for the values argument of the features parameter in the multipath.conf file are documented in Chapter 4, The DM Multipath Configuration File.

Table 4.1, “Multipath Configuration Defaults”. includes an entry for the force_sync parameter, which prevents path checkers from running in async mode when set to "yes".

In addition, small technical corrections and clarifications have been made throughout the document.

⁠1.1.2. New and Changed Features for Red Hat Enterprise Linux 7.2

Red Hat Enterprise Linux 7.2 includes the following documentation and feature updates and changes.

This document includes a new section, Section 5.1, “Automatic Configuration File Generation with Multipath Helper”. The Multipath Helper application gives you options to create multipath configurations with custom aliases, device blacklists, and settings for the characteristics of individual multipath devices.

The defaults section of the multipath.conf configuration file supports the new config_dir, new_bindings_in_boot, ignore_new_boot_devs, retrigger_tries, and retrigger_delays parameters. The defaults section of the multipath.conf file is documented in Table 4.1, “Multipath Configuration Defaults”.

The defaults, devices, and multipaths sections of the multipath.conf configuration file now support the delay_watch_checks and delay_wait_checks configuration parameters. For information on the configuration parameters, see Chapter 4, The DM Multipath Configuration File.

In addition, small technical corrections and clarifications have been made throughout the document.

⁠1.2. Overview of DM Multipath

DM Multipath can be used to provide:

Redundancy

DM Multipath can provide failover in an active/passive configuration. In an active/passive configuration, only half the paths are used at any time for I/O. If any element of an I/O path (the cable, switch, or controller) fails, DM Multipath switches to an alternate path.

Improved Performance

DM Multipath can be configured in active/active mode, where I/O is spread over the paths in a round-robin fashion. In some configurations, DM Multipath can detect loading on the I/O paths and dynamically re-balance the load.

Figure 1.1, “Active/Passive Multipath Configuration with One RAID Device” shows an active/passive configuration with two I/O paths from the server to a RAID device. There are 2 HBAs on the server, 2 SAN switches, and 2 RAID controllers.

⁠

Figure 1.1. Active/Passive Multipath Configuration with One RAID Device

In this configuration, there is one I/O path that goes through hba1, SAN1, and controller 1 and a second I/O path that goes through hba2, SAN2, and controller2. There are many points of possible failure in this configuration:

HBA failure

FC cable failure

SAN switch failure

Array controller port failure

With DM Multipath configured, a failure at any of these points will cause DM Multipath to switch to the alternate I/O path.

Figure 1.2, “Active/Passive Multipath Configuration with Two RAID Devices” shows a more complex active/passive configuration with 2 HBAs on the server, 2 SAN switches, and 2 RAID devices with 2 RAID controllers each.

⁠

Figure 1.2. Active/Passive Multipath Configuration with Two RAID Devices

In the example shown in Figure 1.2, “Active/Passive Multipath Configuration with Two RAID Devices”, there are two I/O paths to each RAID device (just as there are in the example shown in Figure 1.1, “Active/Passive Multipath Configuration with One RAID Device”). With DM Multipath configured, a failure at any of the points of the I/O path to either of the RAID devices will cause DM Multipath to switch to the alternate I/O path for that device.

Figure 1.3, “Active/Active Multipath Configuration with One RAID Device” shows an active/active configuration with 2 HBAs on the server, 1 SAN switch, and 2 RAID controllers. There are four I/O paths from the server to a storage device:

hba1 to controller1

hba1 to controller2

hba2 to controller1

hba2 to controller2

In this configuration, I/O can be spread among those four paths.

⁠

Figure 1.3. Active/Active Multipath Configuration with One RAID Device

⁠1.3. Storage Array Support

By default, DM Multipath includes support for the most common storage arrays that themselves support DM Multipath. For information on the default configuration values, including supported devices, run either of the following commands.

# multipathd show config
# multipath -t

If your storage array supports DM Multipath and is not configured by default, you may need to add it to the DM Multipath configuration file, multipath.conf. For information on the DM Multipath configuration file, see Chapter 4, The DM Multipath Configuration File.

Some storage arrays require special handling of I/O errors and path switching. These require separate hardware handler kernel modules.

⁠1.4. DM Multipath Components

Table 1.1, “DM Multipath Components”. describes the components of DM Multipath.

⁠

Table 1.1. DM Multipath Components

Component | Description
dm_multipath kernel module | Reroutes I/O and supports failover for paths and path groups.
mpathconf utility | Configures and enables device mapper multipathing.
multipath command | Lists and configures multipath devices. Normally started with /etc/rc.sysinit, it can also be started by a udev program whenever a block device is added.
multipathd daemon | Monitors paths; as paths fail and come back, it may initiate path group switches. Allows interactive changes to multipath devices. The daemon must be restarted following any changes to the /etc/multipath.conf file.
kpartx command | Creates device mapper devices for the partitions on a device. It is necessary to use this command for DOS-based partitions with DM Multipath. The kpartx command is provided in its own package, but the device-mapper-multipath package depends on it.

⁠1.5. DM Multipath Setup Overview

DM Multipath includes compiled-in default settings that are suitable for common multipath configurations. The basic procedure for configuring your system with DM Multipath is as follows:

Install the device-mapper-multipath rpm.

Create the configuration file and enable multipathing with the mpathconf command. You can also start the multipath daemon with this command if you do not need to edit the configuration file.

If necessary, edit the multipath.conf configuration file to modify default values and save the updated file.

Start the multipath daemon.

For detailed setup instructions for multipath configuration see Chapter 3, Setting Up DM Multipath.

⁠Chapter 2. Multipath Devices

Without DM Multipath, each path from a server node to a storage controller is treated by the system as a separate device, even when the I/O path connects the same server node to the same storage controller. DM Multipath provides a way of organizing the I/O paths logically, by creating a single multipath device on top of the underlying devices.

⁠2.1. Multipath Device Identifiers

Each multipath device has a World Wide Identifier (WWID), which is guaranteed to be globally unique and unchanging. By default, the name of a multipath device is set to its WWID. Alternately, you can set the user_friendly_names option in the multipath configuration file, which sets the alias to a node-unique name of the form mpathn.

For example, a node with two HBAs attached to a storage controller with two ports via a single unzoned FC switch sees four devices: /dev/sda, /dev/sdb, dev/sdc, and /dev/sdd. DM Multipath creates a single device with a unique WWID that reroutes I/O to those four underlying devices according to the multipath configuration. When the user_friendly_names configuration option is set to yes, the name of the multipath device is set to mpathn.

When new devices are brought under the control of DM Multipath, the new devices may be seen in two different places under the /dev directory: /dev/mapper/mpathn and /dev/dm-n.

The devices in /dev/mapper are created early in the boot process. Use these devices to access the multipathed devices, for example when creating logical volumes.

Any devices of the form /dev/dm-n are for internal use only should never be used by the administrator directly.

For information on the multipath configuration defaults, including the user_friendly_names configuration option, see Section 4.3, “Configuration File Defaults”.

You can also set the name of a multipath device to a name of your choosing by using the alias option in the multipaths section of the multipath configuration file. For information on the multipaths section of the multipath configuration file, see Section 4.4, “Multipaths Device Configuration Attributes”.

⁠2.2. Consistent Multipath Device Names in a Cluster

When the user_friendly_names configuration option is set to yes, the name of the multipath device is unique to a node, but it is not guaranteed to be the same on all nodes using the multipath device. Similarly, if you set the alias option for a device in the multipaths section of the multipath.conf configuration file, the name is not automatically consistent across all nodes in the cluster. This should not cause any difficulties if you use LVM to create logical devices from the multipath device, but if you require that your multipath device names be consistent in every node it is recommended that you not set the user_friendly_names option to yes and that you not configure aliases for the devices. By default, if you do not set user_friendly_names to yes or configure an alias for a device, a device name will be the WWID for the device, which is always the same.

If you want the system-defined user-friendly names to be consistent across all nodes in the cluster, however, you can follow this procedure:

Set up all of the multipath devices on one machine.

Disable all multipath devices on other machines by running the following commands:

# service multipathd stop
# multipath -F

Copy the /etc/multipath/bindings file from the first machine to all the other machines in the cluster.

Re-enable the multipathd daemon on all the other machines in the cluster by running the following command:

# service multipathd start

If you add a new device, you will need to repeat this process.

Similarly, if you configure an alias for a device that you would like to be consistent across the nodes in the cluster, you should ensure that the /etc/multipath.conf file is the same for each node in the cluster by following the same procedure:

Configure the aliases for the multipath devices in the multipath.conf file on one machine.

Disable all multipath devices on other machines by running the following commands:

# service multipathd stop
# multipath -F

Copy the /etc/multipath.conf file from the first machine to all the other machines in the cluster.

Re-enable the multipathd daemon on all the other machines in the cluster by running the following command:

# service multipathd start

When you add a new device you will need to repeat this process.

⁠2.3. Multipath Device Attributes

In addition to the user_friendly_names and alias options, a multipath device has numerous attributes. You can modify these attributes for a specific multipath device by creating an entry for that device in the multipaths section of the multipath configuration file. For information on the multipaths section of the multipath configuration file, see Section 4.4, “Multipaths Device Configuration Attributes”.

⁠2.4. Multipath Devices in Logical Volumes

After creating multipath devices, you can use the multipath device names just as you would use a physical device name when creating an LVM physical volume. For example, if /dev/mapper/mpatha is the name of a multipath device, the following command will mark /dev/mapper/mpatha as a physical volume.

pvcreate /dev/mapper/mpatha

You can use the resulting LVM physical device when you create an LVM volume group just as you would use any other LVM physical device.

Note

If you attempt to create an LVM physical volume on a whole device on which you have configured partitions, the pvcreate command will fail. Note that the Anaconda and Kickstart installation programs create empty partition tables if you do not specify otherwise for every block device. If you wish to use the whole device rather than a partition, you must remove the existing partitions from the device. You can remove existing partitions with the kpartx -d and the fdisk commands. If your system has block devices that are greater that 2Tb, you can use the parted command to remove partitions.

When you create an LVM logical volume that uses active/passive multipath arrays as the underlying physical devices, you should include filters in the /etc/lvm/lvm.conf file to exclude the disks that underlie the multipath devices. This is because if the array automatically changes the active path to the passive path when it receives I/O, multipath will failover and failback whenever LVM scans the passive path if these devices are not filtered. For active/passive arrays that require a command to make the passive path active, LVM prints a warning message when this occurs.

To filter all SCSI devices in the LVM configuration file (lvm.conf), include the following filter in the devices section of the file.

filter = [ "r/block/", "r/disk/", "r/sd.*/", "a/.*/" ]

⁠Chapter 3. Setting Up DM Multipath

This chapter provides step-by-step example procedures for configuring DM Multipath. It includes the following procedures:

Basic DM Multipath setup

Ignoring local disks

Adding more devices to the configuration file

Starting multipath in the initramfs file system

⁠3.1. Setting Up DM Multipath

Before setting up DM Multipath on your system, ensure that your system has been updated and includes the device-mapper-multipath package.

You set up multipath with the mpathconf utility, which creates the multipath configuration file /etc/multipath.conf.

If the /etc/multipath.conf file already exists, the mpathconf utility will edit it.

If the /etc/multipath.conf file does not exist, the mpathconf utility will use the /usr/share/doc/device-mapper-multipath-0.4.9/multipath.conf file as the starting file.

If the /usr/share/doc/device-mapper-multipath-0.4.9/multipath.conf file does not exist the mpathconf utility will create the /etc/multipath.conf file from scratch.

If you do not need to edit the /etc/multipath.conf file, you can set up DM Multipath for a basic failover configuration by running the following command. This command enables the multipath configuration file and starts the multipathd daemon.

# mpathconf --enable --with_multipathd y

If you need to edit the /etc/multipath.conf file before starting the multipathd daemon. use the following procedure to set up DM Multipath for a basic failover configuration.

Run the mpathconf command with the --enable option specified:

# mpathconf --enable

For information on additional options to the mpathconf command you may require, see the mpathconf man page or run the mpathconf command with the --help option specified.

# mpathconf --help
usage: /sbin/mpathconf <command>

Commands:
Enable: --enable
Disable: --disable
Set user_friendly_names (Default y): --user_friendly_names <y|n>
Set find_multipaths (Default y): --find_multipaths <y|n>
Load the dm-multipath modules on enable (Default y): --with_module  <y|n>
start/stop/reload multipathd (Default n): --with_multipathd  <y|n>

Edit the /etc/multipath.conf file if necessary. The default settings for DM Multipath are compiled in to the system and do not need to be explicitly set in the /etc/multipath.conf file.

The default value of path_grouping_policy is set to failover, so in this example you do not need to edit the /etc/multipath.conf file. For information on changing the values in the configuration file to something other than the defaults, see Chapter 4, The DM Multipath Configuration File.

The initial defaults section of the configuration file configures your system so that the names of the multipath devices are of the form mpathn; without this setting, the names of the multipath devices would be aliased to the WWID of the device.

Save the configuration file and exit the editor, if necessary.

Execute the following command:

# service multipathd start

Since the value of user_friendly_name is set to yes in the configuration file, the multipath devices will be created as /dev/mapper/mpathn. For information on setting the name of the device to an alias of your choosing, see Chapter 4, The DM Multipath Configuration File.

If you do not want to use user friendly names, you can run the following command:

# mpathconf --enable --user_friendly_names n

Note

If you find that you need to edit the multipath configuration file after you have started the multipath daemon, you must execute the service multipathd reload command for the changes to take effect.

⁠3.2. Ignoring Local Disks when Generating Multipath Devices

Some machines have local SCSI cards for their internal disks. DM Multipath is not recommended for these devices. If you set the find_multipaths configuration parameter to yes, you should not have to blacklist these devices. For information on the find_multipaths configuration parameter, see Section 4.3, “Configuration File Defaults”.

If you do not set the find_multipaths configuration parameter to yes, can use the following procedure to modify the multipath configuration file to ignore the local disks when configuring multipath.

Determine which disks are the internal disks and mark them as the ones to blacklist.

In this example, /dev/sda is the internal disk. Note that as originally configured in the default multipath configuration file, executing the multipath -v2 command shows the local disk, /dev/sda, in the multipath map.

For further information on the multipath command output, see Section 5.8, “Multipath Command Output”.

# multipath -v2
create: SIBM-ESXSST336732LC____F3ET0EP0Q000072428BX1 undef WINSYS,SF2372
size=33 GB features="0" hwhandler="0" wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 0:0:0:0 sda 8:0  [---------

device-mapper ioctl cmd 9 failed: Invalid argument
device-mapper ioctl cmd 14 failed: No such device or address
create: 3600a0b80001327d80000006d43621677 undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:0 sdb 8:16  undef ready  running
  `- 3:0:0:0 sdf 8:80 undef ready  running

create: 3600a0b80001327510000009a436215ec undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:1 sdc 8:32 undef ready  running
  `- 3:0:0:1 sdg 8:96 undef ready  running

create: 3600a0b80001327d800000070436216b3 undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:2 sdd 8:48 undef ready  running
  `- 3:0:0:2 sdg 8:112 undef ready  running

create: 3600a0b80001327510000009b4362163e undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:3 sdd 8:64 undef ready  running
  `- 3:0:0:3 sdg 8:128 undef ready  running

In order to prevent the device mapper from mapping /dev/sda in its multipath maps, edit the blacklist section of the /etc/multipath.conf file to include this device. Although you could blacklist the sda device using a devnode type, that would not be a safe procedure since /dev/sda is not guaranteed to be the same on reboot. To blacklist individual devices, you can blacklist using the WWID of that device.

Note that in the output to the multipath -v2 command, the WWID of the /dev/sda device is SIBM-ESXSST336732LC____F3ET0EP0Q000072428BX1. To blacklist this device, include the following in the /etc/multipath.conf file.

blacklist {
      wwid SIBM-ESXSST336732LC____F3ET0EP0Q000072428BX1
}

After you have updated the /etc/multipath.conf file, you must manually tell the multipathd daemon to reload the file. The following command reloads the updated /etc/multipath.conf file.

# service multipathd reload

Run the following command to remove the multipath device:

# multipath -f SIBM-ESXSST336732LC____F3ET0EP0Q000072428BX1

To check whether the device removal worked, you can run the multipath -ll command to display the current multipath configuration. For information on the multipath -ll command, see Section 5.9, “Multipath Queries with multipath Command”.

To check that the blacklisted device was not added back, you can run the multipath command, as in the following example. The multipath command defaults to a verbosity level of v2 if you do not specify specify a -v option.

# multipath

create: 3600a0b80001327d80000006d43621677 undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:0 sdb 8:16  undef ready  running
  `- 3:0:0:0 sdf 8:80 undef ready  running

create: 3600a0b80001327510000009a436215ec undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:1 sdc 8:32 undef ready  running
  `- 3:0:0:1 sdg 8:96 undef ready  running

create: 3600a0b80001327d800000070436216b3 undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:2 sdd 8:48 undef ready  running
  `- 3:0:0:2 sdg 8:112 undef ready  running

create: 3600a0b80001327510000009b4362163e undef WINSYS,SF2372
size=12G features='0' hwhandler='0' wp=undef
`-+- policy='round-robin 0' prio=1 status=undef
  |- 2:0:0:3 sdd 8:64 undef ready  running
  `- 3:0:0:3 sdg 8:128 undef ready  running

⁠3.3. Configuring Storage Devices

By default, DM Multipath includes support for the most common storage arrays that themselves support DM Multipath. For information on the default configuration value, including supported devices, run either of the following commands.

# multipathd show config
# multipath -t

If you need to add a storage device that is not supported by default as a known multipath device, edit the /etc/multipath.conf file and insert the appropriate device information.

For example, to add information about the HP Open-V series the entry looks like this. This example sets the device to queue for a minute (or 12 retries and 5 seconds per retry) after all paths have failed.

devices {
        device {
                vendor "HP"
                product "OPEN-V"
                no_path_retry 12
        }
}

For more information on the devices section of the configuration file, see Section 4.5, “Configuration File Devices”.

⁠3.4. Setting Up Multipathing in the initramfs File System

You can set up multipathing in the initramfs file system. After configuring multipath, you can rebuild the initramfs file system with the multipath configuration files by executing the dracut command with the following options:

# dracut --force --add multipath --include /etc/multipath

If you run multipath from the initramfs file system and you make any changes to the multipath configuration files, you must rebuild the initramfs file system for the changes to take effect.

⁠Chapter 4. The DM Multipath Configuration File

By default, DM Multipath provides configuration values for the most common uses of multipathing. In addition, DM Multipath includes support for the most common storage arrays that themselves support DM Multipath. For information on the default configuration values, including supported devices, run either of the following commands.

# multipathd show config
# multipath -t

You can override the default configuration values for DM Multipath by editing the /etc/multipath.conf configuration file. If necessary, you can also add a storage array that is not supported by default to the configuration file.

Note

You can run set up multipathing in the initramfs file system. If you run multipath from the initramfs file system and you make any changes to the multipath configuration files, you must rebuild the initramfs file system for the changes to take effect. For information on rebuilding the initramfs file system with multipath, refer to Section 3.4, “Setting Up Multipathing in the initramfs File System”.

This chapter provides information on parsing and modifying the multipath.conf file. It contains sections on the following topics:

Configuration file overview

Configuration file blacklist

Configuration file defaults

Configuration file multipaths

Configuration file devices

In the multipath configuration file, you need to specify only the sections that you need for your configuration, or that you wish to change from the default values. If there are sections of the file that are not relevant to your environment or for which you do not need to override the default values, you can leave them commented out, as they are in the initial file.

The configuration file allows regular expression description syntax.

Further information about the configuration file can be found on the multipath.conf(5) man page.

⁠4.1. Configuration File Overview

The multipath configuration file is divided into the following sections:

blacklist

Listing of specific devices that will not be considered for multipath.

blacklist_exceptions

Listing of multipath candidates that would otherwise be blacklisted according to the parameters of the blacklist section.

defaults

General default settings for DM Multipath.

multipaths

Settings for the characteristics of individual multipath devices. These values overwrite what is specified in the defaults and devices sections of the configuration file.

devices

Settings for the individual storage controllers. These values overwrite what is specified in the defaults section of the configuration file. If you are using a storage array that is not supported by default, you may need to create a devices subsection for your array.

When the system determines the attributes of a multipath device, first it checks the multipath settings, then the devices settings, then the multipath system defaults.

⁠4.2. Configuration File Blacklist

The blacklist section of the multipath configuration file specifies the devices that will not be used when the system configures multipath devices. Devices that are blacklisted will not be grouped into a multipath device.

In older releases of Red Hat Enterprise Linux, multipath always tried to create a multipath device for every path that was not explicitly blacklisted. As of Red Hat Enterprise Linux 6, however, if the find_multipaths configuration parameter is set to yes, then multipath will create a device only if one of three conditions are met:

There are at least two non-blacklisted paths with the same WWID.

The user manually forces the creation of the device by specifying a device with the multipath command.

A path has the same WWID as a multipath device that was previously created (even if that multipath device does not currently exist). Whenever a multipath device is created, multipath remembers the WWID of the device so that it will automatically create the device again as soon as it sees a path with that WWID. This allows you to have multipath automatically choose the correct paths to make into multipath devices, without have to edit the multipath blacklist.

If you have previously created a multipath device without using the find_multipaths parameter and then you later set the parameter to yes, you may need to remove the WWIDs of any device you do not want created as a multipath device from the /etc/multipath/wwids file. The following shows a sample /etc/multipath/wwids file. The WWIDs are enclosed by slashes (/):

# Multipath wwids, Version : 1.0
# NOTE: This file is automatically maintained by multipath and multipathd.
# You should not need to edit this file in normal circumstances.
#
# Valid WWIDs:
/3600d0230000000000e13955cc3757802/
/3600d0230000000000e13955cc3757801/
/3600d0230000000000e13955cc3757800/
/3600d02300069c9ce09d41c31f29d4c00/
/SWINSYS  SF2372         0E13955CC3757802/
/3600d0230000000000e13955cc3757803/

With the find_multipaths parameter set to yes, you need to blacklist only the devices with multiple paths that you do not want to be multipathed. Because of this, it will generally not be necessary to blacklist devices.

If you do need to blacklist devices, you can do so according to the following criteria:

By WWID, as described in Section 4.2.1, “Blacklisting by WWID”

By device name, as described in Section 4.2.2, “Blacklisting By Device Name”

By device type, as described in Section 4.2.3, “Blacklisting By Device Type”

By default, a variety of device types are blacklisted, even after you comment out the initial blacklist section of the configuration file. For information, see Section 4.2.2, “Blacklisting By Device Name”.

⁠4.2.1. Blacklisting by WWID

You can specify individual devices to blacklist by their World-Wide IDentification with a wwid entry in the blacklist section of the configuration file.

The following example shows the lines in the configuration file that would blacklist a device with a WWID of 26353900f02796769.

blacklist {
       wwid 26353900f02796769
}

⁠4.2.2. Blacklisting By Device Name

You can blacklist device types by device name so that they will not be grouped into a multipath device by specifying a devnode entry in the blacklist section of the configuration file.

The following example shows the lines in the configuration file that would blacklist all SCSI devices, since it blacklists all sd* devices.

blacklist {
       devnode "^sd[a-z]"
}

You can use a devnode entry in the blacklist section of the configuration file to specify individual devices to blacklist rather than all devices of a specific type. This is not recommended, however, since unless it is statically mapped by udev rules, there is no guarantee that a specific device will have the same name on reboot. For example, a device name could change from /dev/sda to /dev/sdb on reboot.

By default, the following devnode entries are compiled in the default blacklist; the devices that these entries blacklist do not generally support DM Multipath. To enable multipathing on any of these devices, you would need to specify them in the blacklist_exceptions section of the configuration file, as described in Section 4.2.4, “Blacklist Exceptions”.

blacklist {
       devnode "^(ram|raw|loop|fd|md|dm-|sr|scd|st)[0-9]*"
       devnode "^(td|ha)d[a-z]"
}

⁠4.2.3. Blacklisting By Device Type

You can specify specific device types in the blacklist section of the configuration file with a device section. The following example blacklists all IBM DS4200 and HP devices.

blacklist {
       device {
               vendor  "IBM"
               product "3S42"       #DS4200 Product 10
       }
       device {
               vendor  "HP"
               product "*"
       }
}

⁠4.2.4. Blacklist Exceptions

You can use the blacklist_exceptions section of the configuration file to enable multipathing on devices that have been blacklisted by default.

For example, if you have a large number of devices and want to multipath only one of them (with the WWID of 3600d0230000000000e13955cc3757803), instead of individually blacklisting each of the devices except the one you want, you could instead blacklist all of them, and then allow only the one you want by adding the following lines to the /etc/multipath.conf file.

blacklist {
        wwid "*"
}

blacklist_exceptions {
        wwid "3600d0230000000000e13955cc3757803"
}

When specifying devices in the blacklist_exceptions section of the configuration file, you must specify the exceptions in the same way they were specified in the blacklist. For example, a WWID exception will not apply to devices specified by a devnode blacklist entry, even if the blacklisted device is associated with that WWID. Similarly, devnode exceptions apply only to devnode entries, and device exceptions apply only to device entries.

⁠4.3. Configuration File Defaults

The /etc/multipath.conf configuration file includes a defaults section that sets the user_friendly_names parameter to yes, as follows.

defaults {
        user_friendly_names yes
}

This overwrites the default value of the user_friendly_names parameter.

The configuration file includes a template of configuration defaults. This section is commented out, as follows.

#defaults {
#       polling_interval        10
#       path_selector           "round-robin 0"
#       path_grouping_policy    multibus
#       uid_attribute           ID_SERIAL
#       prio                    alua
#       path_checker            readsector0
#       rr_min_io               100
#       max_fds                 8192
#       rr_weight               priorities
#       failback                immediate
#       no_path_retry           fail
#       user_friendly_names     yes
#}

To overwrite the default value for any of the configuration parameters, you can copy the relevant line from this template into the defaults section and uncomment it. For example, to overwrite the path_grouping_policy parameter so that it is multibus rather than the default value of failover, copy the appropriate line from the template to the initial defaults section of the configuration file, and uncomment it, as follows.

defaults {
        user_friendly_names     yes
        path_grouping_policy    multibus
}

Table 4.1, “Multipath Configuration Defaults” describes the attributes that are set in the defaults section of the multipath.conf configuration file. These values are used by DM Multipath unless they are overwritten by the attributes specified in the devices and multipaths sections of the multipath.conf file.

⁠

Table 4.1. Multipath Configuration Defaults

Attribute
Description

polling_interval
Specifies the interval between two path checks in seconds. For properly functioning paths, the interval between checks will gradually increase to (4 * polling_interval). The default value is 5.

multipath_dir
The directory where the dynamic shared objects are stored. The default value is system dependent, commonly /lib/multipath.

find_multipaths

Defines the mode for setting up multipath devices. If this parameter is set to yes, then multipath will not try to create a device for every non-blacklisted path. Instead multipath will create a device only if one of three conditions are met:

- There are at least two non-blacklisted paths with the same WWID.

- The user manually forces the creation of the device by specifying a device with the multipath command.

- A path has the same WWID as a multipath device that was previously created. Whenever a multipath device is created with find_multipaths set, multipath remembers the WWID of the device so that it will automatically create the device again as soon as it sees a path with that WWID. This allows you to have multipath automatically choose the correct paths to make into multipath devices, without having to edit the multipath blacklist. For instructions on the procedure to follow if you have previously created multipath devices when the find_multipaths parameter was not set, see Section 4.2, “Configuration File Blacklist”.

The default value is no. The default multipath.conf file created by mpathconf, however, will enable find_multipaths as of Red Hat Enterprise Linux 7.

verbosity
The default verbosity. Higher values increase the verbosity level. Valid levels are between 0 and 6. The default value is 2.

path_selector

Specifies the default algorithm to use in determining what path to use for the next I/O operation. Possible values include:

round-robin 0: Loop through every path in the path group, sending the same amount of I/O to each.

queue-length 0: Send the next bunch of I/O down the path with the least number of outstanding I/O requests.

service-time 0: Send the next bunch of I/O down the path with the shortest estimated service time, which is determined by dividing the total size of the outstanding I/O to each path by its relative throughput.

The default value is round-robin 0.

path_grouping_policy

Specifies the default path grouping policy to apply to unspecified multipaths. Possible values include:

failover: 1 path per priority group.

multibus: all valid paths in 1 priority group.

group_by_serial: 1 priority group per detected serial number.

group_by_prio: 1 priority group per path priority value. Priorities are determined by callout programs specified as global, per-controller, or per-multipath options.

group_by_node_name: 1 priority group per target node name. Target node names are fetched in /sys/class/fc_transport/target*/node_name.

The default value is failover.

prio

Specifies the default function to call to obtain a path priority value. For example, the ALUA bits in SPC-3 provide an exploitable prio value. Possible values include:

const: Set a priority of 1 to all paths.

emc: Generate the path priority for EMC arrays.

alua: Generate the path priority based on the SCSI-3 ALUA settings.

ontap: Generate the path priority for NetApp arrays.

rdac: Generate the path priority for LSI/Engenio RDAC controller.

hp_sw: Generate the path priority for Compaq/HP controller in active/standby mode.

hds: Generate the path priority for Hitachi HDS Modular storage arrays.

The default value is const.

features

The default extra features of multipath devices, using the format: "number_of_features_plus_arguments feature1 ...".

Possible values for features include:

queue_if_no_path, which is the same as setting no_path_retry to queue. For information on issues that may arise when using this feature, see Section 5.7, “Issues with queue_if_no_path feature”.

retain_attached_hw_handler: If this parameter is set to yes and the SCSI layer has already attached a hardware handler to the path device, multipath will not force the device to use the hardware_handler specified by the multipath.conf file. If the SCSI layer has not attached a hardware handler, multipath will continue to use its configured hardware handler as usual. The default value is no.

pg_init_retries n: Retry path group initialization up to n times before failing where 1 <= n <= 50.

pg_init_delay_msecs n: Wait n milliseconds between path group initialization retries where 0 <= n <= 60000.

path_checker

Specifies the default method used to determine the state of the paths. Possible values include:

readsector0: Read the first sector of the device.

tur: Issue a TEST UNIT READY command to the device.

emc_clariion: Query the EMC Clariion specific EVPD page 0xC0 to determine the path.

hp_sw: Check the path state for HP storage arrays with Active/Standby firmware.

rdac: Check the path state for LSI/Engenio RDAC storage controller.

directio: Read the first sector with direct I/O.

The default value is directio.

failback

Manages path group failback.

A value of immediate specifies immediate failback to the highest priority path group that contains active paths.

A value of manual specifies that there should not be immediate failback but that failback can happen only with operator intervention.

A value of followover specifies that automatic failback should be performed when the first path of a path group becomes active. This keeps a node from automatically failing back when another node requested the failover.

A numeric value greater than zero specifies deferred failback, expressed in seconds.

The default value is manual.

rr_min_io
Specifies the number of I/O requests to route to a path before switching to the next path in the current path group. This setting is only for systems running kernels older than 2.6.31. Newer systems should use rr_min_io_rq. The default value is 1000.

rr_min_io_rq
Specifies the number of I/O requests to route to a path before switching to the next path in the current path group, using request-based device-mapper-multipath. This setting should be used on systems running current kernels. On systems running kernels older than 2.6.31, use rr_min_io. The default value is 1.

rr_weight
If set to priorities, then instead of sending rr_min_io requests to a path before calling path_selector to choose the next path, the number of requests to send is determined by rr_min_io times the path's priority, as determined by the prio function. If set to uniform, all path weights are equal. The default value is uniform.

no_path_retry

A numeric value for this attribute specifies the number of times the system should attempt to use a failed path before disabling queuing.

A value of fail indicates immediate failure, without queuing.

A value of queue indicates that queuing should not stop until the path is fixed.

The default value is 0.

user_friendly_names
If set to yes, specifies that the system should use the /etc/multipath/bindings file to assign a persistent and unique alias to the multipath, in the form of mpathn. If set to no, specifies that the system should use the WWID as the alias for the multipath. In either case, what is specified here will be overridden by any device-specific aliases you specify in the multipaths section of the configuration file. The default value is no.

queue_without_daemon
If set to no, the multipathd daemon will disable queuing for all devices when it is shut down. The default value is no.

flush_on_last_del
If set to yes, the multipathd daemon will disable queuing when the last path to a device has been deleted. The default value is no.

max_fds
Sets the maximum number of open file descriptors that can be opened by multipath and the multipathd daemon. This is equivalent to the ulimit -n command. As of the Red Hat Enterprise Linux 6.3 release, the default value is max, which sets this to the system limit from /proc/sys/fs/nr_open. For earlier releases, if this is not set the maximum number of open file descriptors is taken from the calling process; it is usually 1024. To be safe, this should be set to the maximum number of paths plus 32, if that number is greater than 1024.

checker_timeout
The timeout to use for prioritizers and path checkers that issue SCSI commands with an explicit timeout, in seconds. The default value is taken from sys/block/sdx/device/timeout.

fast_io_fail_tmo
The number of seconds the SCSI layer will wait after a problem has been detected on an FC remote port before failing I/O to devices on that remote port. This value should be smaller than the value of dev_loss_tmo. Setting this to off will disable the timeout. The default value is determined by the OS.

dev_loss_tmo
The number of seconds the SCSI layer will wait after a problem has been detected on an FC remote port before removing it from the system. Setting this to infinity will set this to 2147483647 seconds, or 68 years. The default value is determined by the OS.

hwtable_string_match

Each device configuration in the devices section of the multipath.conf file will either create its own device configuration or it will modify one of the built-in device configurations. If hwtable_string_match is set to yes, then if the vendor, product, and revision strings in a user's device configuration exactly match those strings in a built-in device configuration, the built-in configuration is modified by the options in the user's configuration. Otherwise, the user's device configuration is treated as a new configuration. If hwtable_string_match is set to no, a regular expression match is used instead of a string match.

The hwtable_string_match is set to no by default.

retain_attached_hw_handler
If this parameter is set to yes and the SCSI layer has already attached a hardware handler to the path device, multipath will not force the device to use the hardware_handler specified by the multipath.conf file. If the SCSI layer has not attached a hardware handler, multipath will continue to use its configured hardware handler as usual. The default value is no.

detect_prio
If this is set to yes, multipath will first check if the device supports ALUA, and if so it will automatically assign the device the alua prioritizer. If the device doesn't support ALUA, it will determine the prioritizer as it always does. The default value is no.

reload_readwrite
If this is set to yes, the multipathd daemon will listen to path device change events and if a device has become read/write it will reload the multipath device.

uid_attribute
Provides a unique path identifier. The default value is ID_SERIAL.

force_sync
(Red Hat Enterprise Linux Release 7.1 and later) If this is set to "yes", it prevents path checkers from running in async mode.

delay_watch_checks
(Red Hat Enterprise Linux Release 7.2 and later) If set to a value greater than 0, the multipathd daemon will watch paths that have recently become valid for the specified number of checks. If they fail again while they are being watched, when they next become valid they will not be used until they have stayed up for the number of consecutive checks specified with delay_wait_checks. This allows you to keep paths that may be unreliable from immediately being put back into use as soon as they come back online. The default value is no.

delay_wait_checks
(Red Hat Enterprise Linux Release 7.2 and later) If set to a value greater than 0, when a device that has recently come back online fails again within the number of checks specified with delay_watch_checks, the next time it comes back online it will be marked and delayed and it will not be used until it has passed the number of checks specified in delay_wait_checks. The default value is no.

ignore_new_boot_devs
(Red Hat Enterprise Linux Release 7.2 and later) If set to yes, when the node is still in the initramfs file system during early boot, multipath will not create any devices whose WWIDs do not already exist in the initramfs copy of the /etc/multipath/wwids. This feature can be used for booting up during installation, when multipath would otherwise attempt to set itself up on devices that it did not claim when they first appeared via the udev rules. This parameter can be set to yes or no. If unset, it defaults to no.

retrigger_tries, retrigger_delay
(Red Hat Enterprise Linux Release 7.2 and later) The retrigger_tries and retrigger_delay parameters are used in conjunction to make multipathd retrigger uevents if udev failed to completely process the original ones, leaving the device unusable by multipath. The retrigger_tries parameter sets the number of times that multipath will try to retrigger a uevent if a device has not been completely set up. The retrigger_delay parameter sets the number of seconds between retries. Both of these options accept numbers greater than or equal to zero. Setting the retrigger_tries parameter to zero disables retries. Setting the retrigger_delay parameter to zero causes the uevent to be reissued on the next loop of the path checker. If the retrigger_tries parameter is unset, it defaults to 3. If the retrigger_delay parameter is unset, it defaults to 10.

new_bindings_in_boot
(Red Hat Enterprise Linux Release 7.2 and later) The new_bindings_in_boot parameter is used to keep multipath from giving out a user_friendly_name in the initramfs file system that was already given out by the bindings file in the regular file system, an issue that can arise since the user_friendly_names bindings in the initramfs file system get synced with the bindings in the regular file system only when the initramfs file system is remade. When this parameter is set to no multipath will not create any new bindings in the initramfs file system. If a device does not already have a binding in the initramfs copy of /etc/multipath/bindings, multipath will use its WWID as an alias instead of giving it a user_friendly_name. Later in boot, after the node has mounted the regular filesystem, multipath will give out a user_friendly_name to the device. This parameter can be set to yes or no. If unset, it defaults to no.

deferred_remove
If set to yes, multipathd will do a deferred remove instead of a regular remove when the last path device has been deleted. This ensures that if a multipathed device is in use when a regular remove is performed and the remove fails, the device will automatically be removed when the last user closes the device. The default value is no.

log_checker_err
If set to once, multipathd logs the first path checker error at verbosity level 2. Any later errors are logged at verbosity level 3 until the device is restored. If it is set to always, multipathd always logs the path checker error at verbosity level 2. The default value is always.

⁠4.4. Multipaths Device Configuration Attributes

Table 4.2, “Multipath Attributes” shows the attributes that you can set in the multipaths section of the multipath.conf configuration file for each specific multipath device. These attributes apply only to the one specified multipath. These defaults are used by DM Multipath and override attributes set in the defaults and devices sections of the multipath.conf file.

⁠

Table 4.2. Multipath Attributes

Attribute
Description

wwid
Specifies the WWID of the multipath device to which the multipath attributes apply. This parameter is mandatory for this section of the multipath.conf file.

alias
Specifies the symbolic name for the multipath device to which the multipath attributes apply. If you are using user_friendly_names, do not set this value to mpathn; this may conflict with an automatically assigned user friendly name and give you incorrect device node names.

path_grouping_policy

Specifies the default path grouping policy to apply to unspecified multipaths. Possible values include:

failover = 1 path per priority group

multibus = all valid paths in 1 priority group

group_by_serial = 1 priority group per detected serial number

group_by_prio = 1 priority group per path priority value

group_by_node_name = 1 priority group per target node name

path_selector

Specifies the default algorithm to use in determining what path to use for the next I/O operation. Possible values include:

round-robin 0: Loop through every path in the path group, sending the same amount of I/O to each.

queue-length 0: Send the next bunch of I/O down the path with the least number of outstanding I/O requests.

service-time 0: Send the next bunch of I/O down the path with the shortest estimated service time, which is determined by dividing the total size of the outstanding I/O to each path by its relative throughput.

failback

Manages path group failback.

A value of immediate specifies immediate failback to the highest priority path group that contains active paths.

A value of manual specifies that there should not be immediate failback but that failback can happen only with operator intervention.

A value of followover specifies that automatic failback should be performed when the first path of a path group becomes active. This keeps a node from automatically failing back when another node requested the failover.

A numeric value greater than zero specifies deferred failback, expressed in seconds.

prio

Specifies the default function to call to obtain a path priority value. For example, the ALUA bits in SPC-3 provide an exploitable prio value. Possible values include:

const: Set a priority of 1 to all paths.

emc: Generate the path priority for EMC arrays.

alua: Generate the path priority based on the SCSI-3 ALUA settings.

ontap: Generate the path priority for NetApp arrays.

rdac: Generate the path priority for LSI/Engenio RDAC controller.

hp_sw: Generate the path priority for Compaq/HP controller in active/standby mode.

hds: Generate the path priority for Hitachi HDS Modular storage arrays.

no_path_retry

A numeric value for this attribute specifies the number of times the system should attempt to use a failed path before disabling queuing.

A value of fail indicates immediate failure, without queuing.

A value of queue indicates that queuing should not stop until the path is fixed.

rr_min_io
Specifies the number of I/O requests to route to a path before switching to the next path in the current path group. This setting is only for systems running kernels older that 2.6.31. Newer systems should use rr_min_io_rq. The default value is 1000.

rr_min_io_rq
Specifies the number of I/O requests to route to a path before switching to the next path in the current path group, using request-based device-mapper-multipath. This setting should be used on systems running current kernels. On systems running kernels older than 2.6.31, use rr_min_io. The default value is 1.

rr_weight
If set to priorities, then instead of sending rr_min_io requests to a path before calling path_selector to choose the next path, the number of requests to send is determined by rr_min_io times the path's priority, as determined by the prio function. If set to uniform, all path weights are equal.

flush_on_last_del
If set to yes, then multipath will disable queuing when the last path to a device has been deleted.

user_friendly_names
If set to yes, specifies that the system should use the /etc/multipath/bindings file to assign a persistent and unique alias to the multipath, in the form of mpathn. If set to no, specifies that the system should use use the WWID as the alias for the multipath. In either case, what is specified here will be overridden by any device-specific aliases you specify in the multipaths section of the configuration file.

delay_watch_checks
(Red Hat Enterprise Linux Release 7.2 and later) If set to a value greater than 0, the multipathd daemon will watch paths that have recently become valid for the specified number of checks. If they fail again while they are being watched, when they next become valid they will not be used until they have stayed up for the number of consecutive checks specified with delay_wait_checks. This allows you to keep paths that may be unreliable from immediately being put back into use as soon as they come back online.

delay_wait_checks
(Red Hat Enterprise Linux Release 7.2 and later) If set to a value greater than 0, when a device that has recently come back online fails again within the number of checks specified with delay_watch_checks, the next time it comes back online it will be marked and delayed and it will not be used until it has passed the number of checks specified in delay_wait_checks.

config_dir
(Red Hat Enterprise Linux Release 7.2 and later) If set to anything other than "", multipath will search this directory alphabetically for files ending in ".conf" and it will read configuration information from them, just as if the the information were in the /etc/multipath.conf file. This allows you to have one main configuration that you share between machines in addition to a separate machine-specific configuration file or files. The config_dir parameter must either be "" or a fully qualified directory name. This parameter can be set only in the main /etc/multipath.conf file and not in one of the files specified in the config_dir file itself. The default value is /etc/multipath/conf.d.

deferred_remove
If set to yes, multipathd will do a deferred remove instead of a regular remove when the last path device has been deleted. This ensures that if a multipathed device is in use when a regular remove is performed and the remove fails, the device will automatically be removed when the last user closes the device.

The following example shows multipath attributes specified in the configuration file for two specific multipath devices. The first device has a WWID of 3600508b4000156d70001200000b0000 and a symbolic name of yellow.

The second multipath device in the example has a WWID of 1DEC_____321816758474 and a symbolic name of red. In this example, the rr_weight attributes is set to priorities.

multipaths {
       multipath {
              wwid                  3600508b4000156d70001200000b0000
              alias                 yellow
              path_grouping_policy  multibus
              path_selector         "round-robin 0"
              failback              manual
              rr_weight             priorities
              no_path_retry         5
       }
       multipath {
              wwid                  1DEC_____321816758474
              alias                 red
              rr_weight             priorities
        }
}

⁠4.5. Configuration File Devices

Table 4.3, “Device Attributes” shows the attributes that you can set for each individual storage device in the devices section of the multipath.conf configuration file. These attributes are used by DM Multipath unless they are overwritten by the attributes specified in the multipaths section of the multipath.conf file for paths that contain the device. These attributes override the attributes set in the defaults section of the multipath.conf file.

Many devices that support multipathing are included by default in a multipath configuration. For information on the default configuration value, including supported devices, run either of the following commands.

# multipathd show config
# multipath -t

You probably will not need to modify the values for these devices, but if you do you can overwrite the default values by including an entry in the configuration file for the device that overwrites those values. You can copy the device configuration defaults for the device that the multipathd show config command displays and override the values that you want to change.

To add a device that is not configured automatically by default to this section of the configuration file, you need to set the vendor and product parameters. You can find these values by looking at /sys/block/device_name/device/vendor and /sys/block/device_name/device/model where device_name is the device to be multipathed, as in the following example:

# cat /sys/block/sda/device/vendor
WINSYS
# cat /sys/block/sda/device/model
SF2372

The additional parameters to specify depend on your specific device. If the device is active/active, you will usually not need to set additional parameters. You may want to set path_grouping_policy to multibus. Other parameters you may need to set are no_path_retry and rr_min_io, as described in Table 4.3, “Device Attributes”.

If the device is active/passive, but it automatically switches paths with I/O to the passive path, you need to change the checker function to one that does not send I/O to the path to test if it is working (otherwise, your device will keep failing over). This almost always means that you set the path_checker to tur; this works for all SCSI devices that support the Test Unit Ready command, which most do.

If the device needs a special command to switch paths, then configuring this device for multipath requires a hardware handler kernel module. The current available hardware handler is emc. If this is not sufficient for your device, you may not be able to configure the device for multipath.

⁠

Table 4.3. Device Attributes

Attribute
Description

vendor
Specifies the vendor name of the storage device to which the device attributes apply, for example COMPAQ.

product
Specifies the product name of the storage device to which the device attributes apply, for example HSV110 (C)COMPAQ.

revision
Specifies the product revision identifier of the storage device.

product_blacklist
Specifies a regular expression used to blacklist devices by product.

hardware_handler

Specifies a module that will be used to perform hardware specific actions when switching path groups or handling I/O errors. Possible values include:

1 emc: hardware handler for EMC storage arrays.

1 alua: hardware handler for SCSI-3 ALUA arrays.

1 hp_sw: hardware handler for Compaq/HP controllers.

1 rdac: hardware handler for the LSI/Engenio RDAC controllers.

path_grouping_policy

Specifies the default path grouping policy to apply to unspecified multipaths. Possible values include:

failover = 1 path per priority group

multibus = all valid paths in 1 priority group

group_by_serial = 1 priority group per detected serial number

group_by_prio = 1 priority group per path priority value

group_by_node_name = 1 priority group per target node name

path_selector

Specifies the default algorithm to use in determining what path to use for the next I/O operation. Possible values include:

round-robin 0: Loop through every path in the path group, sending the same amount of I/O to each.

queue-length 0: Send the next bunch of I/O down the path with the least number of outstanding I/O requests.

service-time 0: Send the next bunch of I/O down the path with the shortest estimated service time, which is determined by dividing the total size of the outstanding I/O to each path by its relative throughput.

path_checker

Specifies the default method used to determine the state of the paths. Possible values include:

readsector0: Read the first sector of the device.

tur: Issue a TEST UNIT READY to the device.

emc_clariion: Query the EMC Clariion specific EVPD page 0xC0 to determine the path.

hp_sw: Check the path state for HP storage arrays with Active/Standby firmware.

rdac: Check the path stat for LSI/Engenio RDAC storage controller.

directio: Read the first sector with direct I/O.

features

The default extra features of multipath devices, using the format: "number_of_features_plus_arguments feature1 ...".

Possible values for features include:

queue_if_no_path, which is the same as setting no_path_retry to queue. For information on issues that may arise when using this feature, see Section 5.7, “Issues with queue_if_no_path feature”.

retain_attached_hw_handler: If this parameter is set to yes and the SCSI layer has already attached a hardware handler to the path device, multipath will not force the device to use the hardware_handler specified by the multipath.conf file. If the SCSI layer has not attached a hardware handler, multipath will continue to use its configured hardware handler as usual.

pg_init_retries n: Retry path group initialization up to n times before failing where 1 <= n <= 50.

pg_init_delay_msecs n: Wait n milliseconds between path group initialization retries where 0 <= n <= 60000.

prio

Specifies the default function to call to obtain a path priority value. For example, the ALUA bits in SPC-3 provide an exploitable prio value. Possible values include:

const: Set a priority of 1 to all paths.

emc: Generate the path priority for EMC arrays.

alua: Generate the path priority based on the SCSI-3 ALUA settings.

ontap: Generate the path priority for NetApp arrays.

rdac: Generate the path priority for LSI/Engenio RDAC controller.

hp_sw: Generate the path priority for Compaq/HP controller in active/standby mode.

hds: Generate the path priority for Hitachi HDS Modular storage arrays.

failback

Manages path group failback.

A value of immediate specifies immediate failback to the highest priority path group that contains active paths.

A value of manual specifies that there should not be immediate failback but that failback can happen only with operator intervention.

A value of followover specifies that automatic failback should be performed when the first path of a path group becomes active. This keeps a node from automatically failing back when another node requested the failover.

A numeric value greater than zero specifies deferred failback, expressed in seconds.

rr_weight
If set to priorities, then instead of sending rr_min_io requests to a path before calling path_selector to choose the next path, the number of requests to send is determined by rr_min_io times the path's priority, as determined by the prio function. If set to uniform, all path weights are equal.

no_path_retry

A numeric value for this attribute specifies the number of times the system should attempt to use a failed path before disabling queuing.

A value of fail indicates immediate failure, without queuing.

A value of queue indicates that queuing should not stop until the path is fixed.

rr_min_io
Specifies the number of I/O requests to route to a path before switching to the next path in the current path group. This setting is only for systems running kernels older that 2.6.31. Newer systems should use rr_min_io_rq. The default value is 1000.

rr_min_io_rq
Specifies the number of I/O requests to route to a path before switching to the next path in the current path group, using request-based device-mapper-multipath. This setting should be used on systems running current kernels. On systems running kernels older than 2.6.31, use rr_min_io. The default value is 1.

fast_io_fail_tmo
The number of seconds the SCSI layer will wait after a problem has been detected on an FC remote port before failing I/O to devices on that remote port. This value should be smaller than the value of dev_loss_tmo. Setting this to off will disable the timeout.

dev_loss_tmo
The number of seconds the SCSI layer will wait after a problem has been detected on an FC remote port before removing it from the system. Setting this to infinity will set this to 2147483647 seconds,or 68 years.

flush_on_last_del
If set to yes, the multipathd daemon will disable queuing when the last path to a device has been deleted.

user_friendly_names
If set to yes, specifies that the system should use the /etc/multipath/bindings file to assign a persistent and unique alias to the multipath, in the form of mpathn. If set to no, specifies that the system should use use the WWID as the alias for the multipath. In either case, what is specified here will be overridden by any device-specific aliases you specify in the multipaths section of the configuration file. The default value is no.

retain_attached_hw_handler
If this parameter is set to yes and the SCSI layer has already attached a hardware handler to the path device, multipath will not force the device to use the hardware_handler specified by the multipath.conf file. If the SCSI layer has not attached a hardware handler, multipath will continue to use its configured hardware handler as usual. The default value is no.

detect_prio
If this is set to yes, multipath will first check if the device supports ALUA, and if so it will automatically assign the device the alua prioritizer. If the device doesn't support ALUA, it will determine the prioritizer as it always does.

delay_watch_checks
(Red Hat Enterprise Linux Release 7.2 and later) If set to a value greater than 0, the multipathd daemon will watch paths that have recently become valid for the specified number of checks. If they fail again while they are being watched, when they next become valid they will not be used until they have stayed up for the number of consecutive checks specified with delay_wait_checks. This allows you to keep paths that may be unreliable from immediately being put back into use as soon as they come back online.

delay_wait_checks
(Red Hat Enterprise Linux Release 7.2 and later) If set to a value greater than 0, when a device that has recently come back online fails again within the number of checks specified with delay_watch_checks, the next time it comes back online it will be marked and delayed and it will not be used until it has passed the number of checks specified in delay_wait_checks.

deferred_remove
If set to yes, multipathd will do a deferred remove instead of a regular remove when the last path device has been deleted. This ensures that if a multipathed device is in use when a regular remove is performed and the remove fails, the device will automatically be removed when the last user closes the device.

The following example shows a device entry in the multipath configuration file.

#	}
#	device {
#		vendor			"COMPAQ  "
#		product			"MSA1000         "
#		path_grouping_policy	multibus
#		path_checker		tur
#		rr_weight		priorities
#	}
#}

⁠Chapter 5. DM Multipath Administration and Troubleshooting

This chapter provides information on administering DM Multipath on a running system.

⁠5.1. Automatic Configuration File Generation with Multipath Helper

You can generate a basic configuration for multipath devices on Red Hat Enterprise Linux with the Multipath Helper application. The application gives you options to create multipath configurations with custom aliases, device blacklists, and settings for the characteristics of individual multipath devices. Upon completion, the application generates an installation script that includes the configuration parameters you selected and it provides a multipath.conf configuration file for review.

The Multipath Helper application can be found at https://access.redhat.com/labsinfo/multipathhelper.

⁠5.2. Resizing an Online Multipath Device

If you need to resize an online multipath device, use the following procedure.

Resize your physical device.

Execute the following command to find the paths to the LUN:

# multipath -l

Resize your paths. For SCSI devices, writing a 1 to the rescan file for the device causes the SCSI driver to rescan, as in the following command:

# echo 1 > /sys/block/device_name/device/rescan

Resize your multipath device by executing the multipathd resize command:

# multipathd -k'resize map mpatha'

Resize the file system (assuming no LVM or DOS partitions are used):

# resize2fs /dev/mapper/mpatha

⁠5.3. Moving root File Systems from a Single Path Device to a Multipath Device

If you have installed your system on a single-path device and later add another path to the root file system, you will need to move your root file system to a multipathed device. This section documents the procedure for moving from a single-path to a multipathed device.

After ensuring that you have installed the device-mapper-multipath package, perform the following procedure:

Execute the following command to create the /etc/multipath.conf configuration file, load the multipath module, and set chkconfig for the multipathd to on:

# mpathconf --enable

For further information on using the mpathconf command to set up multipathing, see Section 3.1, “Setting Up DM Multipath”.

If the find_multipaths configuration parameter is not set to yes, edit the blacklist and blacklist_exceptions sections of the /etc/multipath.conf file, as described in Section 4.2, “Configuration File Blacklist”.

In order for multipath to build a multipath device on top of the root device as soon as it is discovered, run the following command. This command also ensures that find_multipaths will allow the device, even if it only has one path.

# multipath -a root_devname

For example, if the root device is /dev/sdb, run the following command.

# multipath -a /dev/sdb
wwid '3600d02300069c9ce09d41c4ac9c53200' added

To confirm that your configuration file is set up correctly, you can run the multipath command and search the output for a line of the following format. This indicates that the command failed to create the multipath device.

date  wwid: ignoring map

For example, if the WWID if the device is 3600d02300069c9ce09d41c4ac9c53200, you would see a line in the output such as the following:

# multipath
Oct 21 09:37:19 | 3600d02300069c9ce09d41c4ac9c53200: ignoring map

To rebuild the initramfs file system with multipath, execute the dracut command with the following options:

# dracut --force -H --add multipath

Shut the machine down.

Configure the FC switch so that other paths are visible to the machine.

Boot the machine.

Check whether the root file system ('/') is on the multipathed device.

⁠5.4. Moving swap File Systems from a Single Path Device to a Multipath Device

By default, swap devices are set up as logical volumes. This does not require any special procedure for configuring them as multipath devices as long as you set up multipathing on the physical volumes that constitute the logical volume group. If your swap device is not an LVM volume, however, and it is mounted by device name, you may need to edit the /etc/fstab file to switch to the appropriate multipath device name.

Determine the WWID number of the swap device by running the /sbin/multipath command with the -v3 option. The output from the command should show the swap device in the paths list.

You should look in the command output for a line of the following format, showing the swap device:

WWID  H:B:T:L devname MAJOR:MINOR

For example, if your swap file system is set up on sda or one of its partitions, you would see a line in the output such as the following:

===== paths list =====
...
1ATA     WDC WD800JD-75MSA3                           WD-WMAM9F 1:0:0:0 sda 8:0
...

Set up an alias for the swap device in the /etc/multipath.conf file:

multipaths {
    multipath {
        wwid WWID_of_swap_device
        alias swapdev
    }
}

Edit the /etc/fstab file and replace the old device path to the root device with the multipath device.

For example, if you had the following entry in the /etc/fstab file:

/dev/sda2 swap                    ext4    defaults        0 0

You would change the entry to the following:

/dev/mapper/swapdev swap          ext4    defaults        0 0

⁠5.5. The Multipath Daemon

If you find you have trouble implementing a multipath configuration, you should ensure that the multipath daemon is running, as described in Chapter 3, Setting Up DM Multipath. The multipathd daemon must be running in order to use multipathed devices.

⁠5.6. Issues with Large Number of LUNs

When a large number of LUNs are added to a node, using multipathed devices can significantly increase the time it takes for the udev device manager to create device nodes for them. If you experience this problem, you can correct it by deleting the following line in /etc/udev/rules.d/40-multipath.rules:

KERNEL!="dm-[0-9]*", ACTION=="add", PROGRAM=="/bin/bash -c '/sbin/lsmod | /bin/grep ^dm_multipath'", RUN+="/sbin/multipath -v0 %M:%m"

This line causes the udev device manager to run multipath every time a block device is added to the node. Even with this line removed, the multipathd daemon will still automatically create multipathed devices, and multipath will still be called during the boot process for nodes with multipathed root file systems. The only change is that multipathed devices will not be automatically created when the multipathd daemon is not running, which should not be a problem for the vast majority of multipath users.

⁠5.7. Issues with queue_if_no_path feature

If a multipath device is configured with features "1 queue_if_no_path", then any process that issues I/O will hang until one or more paths are restored. To avoid this, set the no_path_retry N parameter in the /etc/multipath.conf file (where N is the number of times the system should retry a path).

If you need to use the features "1 queue_if_no_path" option and you experience the issue noted here, use the dmsetup command to edit the policy at runtime for a particular LUN (that is, for which all the paths are unavailable). For example, if you want to change the policy on the multipath device mpathc from "queue_if_no_path" to "fail_if_no_path", execute the following command.

dmsetup message mpathc 0 "fail_if_no_path"

Note that you must specify the mpathn alias rather than the path.

⁠5.8. Multipath Command Output

When you create, modify, or list a multipath device, you get a display of the current device setup. The format is as follows.

For each multipath device:

 action_if_any: alias (wwid_if_different_from_alias) dm_device_name_if_known vendor,product size=size features='features' hwhandler='hardware_handler' wp=write_permission_if_known

For each path group:

-+- policy='scheduling_policy' prio=prio_if_known status=path_group_status_if_known

For each path:

 `- host:channel:id:lun devnode major:minor dm_status_if_known path_status online_status

For example, the output of a multipath command might appear as follows:

3600d0230000000000e13955cc3757800 dm-1 WINSYS,SF2372
size=269G features='0' hwhandler='0' wp=rw
|-+- policy='round-robin 0' prio=1 status=active
| `- 6:0:0:0 sdb 8:16  active ready  running
`-+- policy='round-robin 0' prio=1 status=enabled
  `- 7:0:0:0 sdf 8:80  active ready  running

If the path is up and ready for I/O, the status of the path is ready or ghost. If the path is down, the status is faulty or shaky. The path status is updated periodically by the multipathd daemon based on the polling interval defined in the /etc/multipath.conf file.

The dm status is similar to the path status, but from the kernel's point of view. The dm status has two states: failed, which is analogous to faulty, and active which covers all other path states. Occasionally, the path state and the dm state of a device will temporarily not agree.

The possible values for online_status are running and offline. A status of offline means that this SCSI device has been disabled.

Note

When a multipath device is being created or modified, the path group status, the dm device name, the write permissions, and the dm status are not known. Also, the features are not always correct.

⁠5.9. Multipath Queries with multipath Command

You can use the -l and -ll options of the multipath command to display the current multipath configuration. The -l option displays multipath topology gathered from information in sysfs and the device mapper. The -ll option displays the information the -l option displays in addition to all other available components of the system.

When displaying the multipath configuration, there are three verbosity levels you can specify with the -v option of the multipath command. Specifying -v0 yields no output. Specifying -v1 outputs the created or updated multipath names only, which you can then feed to other tools such as kpartx. Specifying -v2 prints all detected paths, multipaths, and device maps.

The following example shows the output of a multipath -l command.

# multipath -l
3600d0230000000000e13955cc3757800 dm-1 WINSYS,SF2372
size=269G features='0' hwhandler='0' wp=rw
|-+- policy='round-robin 0' prio=1 status=active
| `- 6:0:0:0 sdb 8:16  active ready  running
`-+- policy='round-robin 0' prio=1 status=enabled
  `- 7:0:0:0 sdf 8:80  active ready  running

The following example shows the output of a multipath -ll command.

# multipath -ll
3600d0230000000000e13955cc3757801 dm-10 WINSYS,SF2372
size=269G features='0' hwhandler='0' wp=rw
|-+- policy='round-robin 0' prio=1 status=enabled
| `- 19:0:0:1 sdc 8:32  active ready  running
`-+- policy='round-robin 0' prio=1 status=enabled
  `- 18:0:0:1 sdh 8:112 active ready  running
3600d0230000000000e13955cc3757803 dm-2 WINSYS,SF2372
size=125G features='0' hwhandler='0' wp=rw
`-+- policy='round-robin 0' prio=1 status=active
  |- 19:0:0:3 sde 8:64  active ready  running
  `- 18:0:0:3 sdj 8:144 active ready  running

⁠5.10. Multipath Command Options

Table 5.1, “Useful multipath Command Options” describes some options of the multipath command that you may find useful.

⁠

Table 5.1. Useful multipath Command Options

Option | Description
-l | Display the current multipath configuration gathered from sysfs and the device mapper.
-ll | Display the current multipath configuration gathered from sysfs, the device mapper, and all other available components on the system.
-f device | Remove the named multipath device.
-F | Remove all unused multipath devices.
-w device | Remove the wwid of the specified device from the wwids file.
-W | Reset the wwids file to include only the current multipath devices.

Some multipathd commands include a format option followed by a wildcard. You can display a list of available wildcards with the following command.

# multipathd show wildcards

⁠5.11. Determining Device Mapper Entries with the dmsetup Command

You can use the dmsetup command to find out which device mapper entries match the multipathed devices.

The following command displays all the device mapper devices and their major and minor numbers. The minor numbers determine the name of the dm device. For example, a minor number of 3 corresponds to the multipathed device /dev/dm-3.

# dmsetup ls
mpathd  (253:4)
mpathep1        (253:12)
mpathfp1        (253:11)
mpathb  (253:3)
mpathgp1        (253:14)
mpathhp1        (253:13)
mpatha  (253:2)
mpathh  (253:9)
mpathg  (253:8)
VolGroup00-LogVol01     (253:1)
mpathf  (253:7)
VolGroup00-LogVol00     (253:0)
mpathe  (253:6)
mpathbp1        (253:10)
mpathd  (253:5)

⁠5.12. Troubleshooting with the multipathd Interactive Console

The multipathd -k command is an interactive interface to the multipathd daemon. Entering this command brings up an interactive multipath console. After executing this command, you can enter help to get a list of available commands, you can enter a interactive command, or you can enter CTRL-D to quit.

The multipathd interactive console can be used to troubleshoot problems you may be having with your system. For example, the following command sequence displays the multipath configuration, including the defaults, before exiting the console.

# multipathd -k
> > show config
> > CTRL-D

The following command sequence ensures that multipath has picked up any changes to the multipath.conf,

# multipathd -k
> > reconfigure
> > CTRL-D

Use the following command sequence to ensure that the path checker is working properly.

# multipathd -k
> > show paths
> > CTRL-D

⁠Appendix A. Revision History

Revision History

Revision 0.3-6
Mon Nov 9 2015
Steven Levine

Preparing document for 7.2 GA publication

Revision 0.3-3
Wed Aug 19 2015
Steven Levine

Preparing document for 7.2 Beta publication

Revision 0.2-7
Mon Feb 16 2015
Steven Levine

Version for 7.1 GA release

Revision 0.2-6
Thu Dec 11 2014
Steven Levine

Version for 7.1 Beta release

Revision 0.2-2
Tue Dec 2 2014
Steven Levine

Resolves: #1162514, #1085979, #1129897

Small updates for technical clarification and correction.

Resolves: #1117037

Documents -w and -W options of the multipath command.

Resolves: #1117043

Documents new options for the features configuration parameter.

Resolves: #1117499

Documents -force_sync configuration parameter.

Revision 0.2-1
Thu Oct 30 2014
Steven Levine

Build to update procedure for moving root file system for 7.0

Revision 0.2-0
Wed Oct 22 2014
Steven Levine

Updated procedure for moving root file system

Revision 0.1-22
Mon Jun 2 2014
Steven Levine

Version for 7.0 GA release

Revision 0.1-20
Tue May 20 2014
Steven Levine

Rebuild for style changes

Resolves: #1069212, #1074858

Document new and updated parameters

Resolves: #1040328

Small technical fixes

Revision 0.1-10
Wed Apr 9 2014
Steven Levine

7.0 Beta update

Revision 0.1-3
Tue Nov 26 2013
Steven Levine

Version for 7.0 pre-Beta

Revision 0.1-2
Tue Nov 12 2013
Steven Levine

Removing RHEL 6 references.

Revision 0.1-1
Wed Jan 16 2013
Steven Levine

Branched from the Red Hat Enterprise Linux 6 version of the document

⁠Index

Symbols

/etc/multipath.conf package, Setting Up DM Multipath

A

active/active configuration

definition, Overview of DM Multipath

illustration, Overview of DM Multipath

active/passive configuration

definition, Overview of DM Multipath

illustration, Overview of DM Multipath

alias parameter , Multipaths Device Configuration Attributes

configuration file, Multipath Device Identifiers

B

blacklist

configuration file, Configuration File Blacklist

default devices, Blacklisting By Device Name

device name, Blacklisting By Device Name

device type, Blacklisting By Device Type

WWID, Blacklisting by WWID

blacklist_exceptions section

multipath.conf file, Blacklist Exceptions

C

checker_timeout parameter, Configuration File Defaults

configuration file

alias parameter, Multipaths Device Configuration Attributes

blacklist, Configuration File Blacklist

checker_timeout parameter, Configuration File Defaults

config_dir parameter, Multipaths Device Configuration Attributes

deferred_remove parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

delay_wait_checks parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

delay_watch_checks parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

detect_prio parameter, Configuration File Defaults, Multipaths Device Configuration Attributes

dev_loss_tmo parameter, Configuration File Defaults, Configuration File Devices

failback parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

fast_io_fail_tmo parameter, Configuration File Defaults, Configuration File Devices

features parameter, Configuration File Defaults, Configuration File Devices

flush_on_last_del parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

force_sync parameter, Configuration File Defaults

hardware_handler parameter, Configuration File Devices

hwtable_string_match parameter, Configuration File Defaults

ignore_new_boot_devs parameter, Configuration File Defaults

log_checker_err parameter, Configuration File Defaults

max_fds parameter, Configuration File Defaults

new_bindings_in_boot parameter, Configuration File Defaults

no_path_retry parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

overview, Configuration File Overview

path_checker parameter, Configuration File Defaults, Configuration File Devices

path_grouping_policy parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

path_selector parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

polling-interval parameter, Configuration File Defaults

prio parameter, Configuration File Defaults, Configuration File Devices

product parameter, Configuration File Devices

product_blacklist parameter, Configuration File Devices

queue_without_daemon parameter, Configuration File Defaults

retain_attached_hw_handler parameter, Configuration File Defaults, Multipaths Device Configuration Attributes

retrigger_delay parameter, Configuration File Defaults

retrigger_tries parameter, Configuration File Defaults

revision parameter, Configuration File Devices

rr_min_io parameter, Configuration File Defaults, Multipaths Device Configuration Attributes

rr_weight parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

uid_attribute parameter, Configuration File Defaults

user_friendly_names parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

vendor parameter, Configuration File Devices

verbosity parameter, Configuration File Defaults

wwid parameter, Multipaths Device Configuration Attributes

configuring

DM Multipath, Setting Up DM Multipath

config_dir parameter, Multipaths Device Configuration Attributes

D

defaults section

multipath.conf file, Configuration File Defaults

deferred_remove parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

delay_wait_checks parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

delay_watch_checks parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

detect_prio parameter, Configuration File Defaults, Multipaths Device Configuration Attributes

dev/mapper directory, Multipath Device Identifiers

device name, Multipath Device Identifiers

device-mapper-multipath package, Setting Up DM Multipath

devices

adding, Configuring Storage Devices, Configuration File Devices

devices section

multipath.conf file, Configuration File Devices

dev_loss_tmo parameter, Configuration File Defaults, Configuration File Devices

DM Multipath

and LVM, Multipath Devices in Logical Volumes

components, DM Multipath Components

configuration file, The DM Multipath Configuration File

configuring, Setting Up DM Multipath

definition, Device Mapper Multipathing

device name, Multipath Device Identifiers

devices, Multipath Devices

failover, Overview of DM Multipath

overview, Overview of DM Multipath

redundancy, Overview of DM Multipath

setup, Setting Up DM Multipath

setup, overview, DM Multipath Setup Overview

dm-n devices, Multipath Device Identifiers

dmsetup command, determining device mapper entries, Determining Device Mapper Entries with the dmsetup Command

dm_multipath kernel module , DM Multipath Components

F

failback parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

failover, Overview of DM Multipath

fast_io_fail_tmo parameter, Configuration File Defaults, Configuration File Devices

features parameter, Configuration File Defaults, Configuration File Devices

features, new and changed, New and Changed Features

flush_on_last_del parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

force_sync parameter, Configuration File Defaults

H

hardware_handler parameter, Configuration File Devices

hwtable_string_match parameter, Configuration File Defaults

I

ignore_new_boot_devs parameter, Configuration File Defaults

initramfs

starting multipath, Setting Up Multipathing in the initramfs File System

K

kpartx command , DM Multipath Components

L

local disks, ignoring, Ignoring Local Disks when Generating Multipath Devices

log_checker_err parameter, Configuration File Defaults

LVM physical volumes

multipath devices, Multipath Devices in Logical Volumes

lvm.conf file , Multipath Devices in Logical Volumes

M

max_fds parameter, Configuration File Defaults

mpathconf command , DM Multipath Components

multipath command , DM Multipath Components

options, Multipath Command Options

output, Multipath Command Output

queries, Multipath Queries with multipath Command

multipath daemon (multipathd), The Multipath Daemon

multipath devices, Multipath Devices

logical volumes, Multipath Devices in Logical Volumes

LVM physical volumes, Multipath Devices in Logical Volumes

Multipath Helper, Automatic Configuration File Generation with Multipath Helper

multipath.conf file, Storage Array Support, The DM Multipath Configuration File

blacklist_exceptions section, Blacklist Exceptions

defaults section, Configuration File Defaults

devices section, Configuration File Devices

multipaths section, Multipaths Device Configuration Attributes

multipathd

command, Troubleshooting with the multipathd Interactive Console

interactive console, Troubleshooting with the multipathd Interactive Console

multipathd daemon , DM Multipath Components

multipathd start command, Setting Up DM Multipath

multipathed root file system, Moving root File Systems from a Single Path Device to a Multipath Device

multipathed swap file system, Moving swap File Systems from a Single Path Device to a Multipath Device

multipaths section

multipath.conf file, Multipaths Device Configuration Attributes

N

new_bindings_in_boot parameter, Configuration File Defaults

no_path_retry parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

O

overview

features, new and changed, New and Changed Features

P

path_checker parameter, Configuration File Defaults, Configuration File Devices

path_grouping_policy parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

path_selector parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

polling_interval parameter, Configuration File Defaults

prio parameter, Configuration File Defaults, Configuration File Devices

product parameter, Configuration File Devices

product_blacklist parameter, Configuration File Devices

Q

queue_without_daemon parameter, Configuration File Defaults

R

resizing a multipath device, Resizing an Online Multipath Device

retain_attached_hw_handler parameter, Configuration File Defaults, Multipaths Device Configuration Attributes

retrigger_delay parameter, Configuration File Defaults

retrigger_tries parameter, Configuration File Defaults

revision parameter, Configuration File Devices

root file system, Moving root File Systems from a Single Path Device to a Multipath Device

rr_min_io parameter, Configuration File Defaults, Multipaths Device Configuration Attributes

rr_weight parameter, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

S

setup

DM Multipath, Setting Up DM Multipath

storage array support, Storage Array Support

storage arrays

adding, Configuring Storage Devices, Configuration File Devices

swap file system, Moving swap File Systems from a Single Path Device to a Multipath Device

U

uid_attribute parameter, Configuration File Defaults

user_friendly_names parameter , Multipath Device Identifiers, Configuration File Defaults, Multipaths Device Configuration Attributes, Configuration File Devices

V

vendor parameter, Configuration File Devices

verbosity parameter, Configuration File Defaults

W

World Wide Identifier (WWID), Multipath Device Identifiers

wwid parameter, Multipaths Device Configuration Attributes